-1.0 -0.5 0.0 0.5 1.0 1.5 2.0

Color (g_sdss-r_sdss)

-0.3

-0.2

-0.1

0.0

0.1 g_cfht-g_sdss

Fit (all): -0.143

Fit (limited): -0.158

French: -0.156

-1.0 -0.5 0.0 0.5 1.0 1.5 2.0 Color (g_sdss-r_sdss)

-0.04

-0.02

0.00

0.02 r_cfht-r_sdss

Fit (all): -0.020 Fit (limited): -0.019 French: 0.000

-0.5 0.0 0.5 1.0 1.5 2.0 2.5

Color (r_sdss-i_sdss)

-0.20

-0.15

-0.10

-0.05

0.00

0.05 i_cfht-i_sdss

Fit (all): -0.085

Fit (limited): -0.086

French: -0.094

-0.5 0.0 0.5 1.0 Color (i_sdss-z_sdss)

-0.02

0.00

0.02 z_cfht-z_sdss

Fit (all): 0.064 Fit (limited): 0.056 French: 0.050